images
Fluid Dynamics & Materials Processing
images

DOI: 10.32604/fdmp.2024.053146

RETRACTION

Retraction: Optimized Design of Bio-inspired Wind Turbine Blades

Yuanjun Dai1,4,*, Dong Wang1, Xiongfei Liu2 and Weimin Wu3

1School of Mechanical Engineering, Shanghai DianJi University, Shanghai, 201306, China
2School of Information Engineering, Yinchuan University of Science and Technology, Yinchuan, 750000, China
3School of Mechanical and Power Engineering, Chongqing University of Science and Technology, Chongqing, 401331, China
4School of Aeronautical Mechanical and Electrical Engineering, Chongqing Aerospace Polytechnic, Chongqing, 400021, China
*Corresponding Author: Yuanjun Dai. Email: daiyj@sdju.edu.cn
Published Online: 23 July 2024

The published article titled “Optimized Design of Bio-inspired Wind Turbine Blades” has been retracted from Fluid Dynamics & Materials Processing.

DOI: 10.32604/fdmp.2024.046158

URL: http://www.techscience.com/fdmp/online/detail/20321

Retraction Statement: After repeated experiments, we discovered errors in the wing profile extraction process mentioned in our article. This raised doubts about whether the extracted wing profile is indeed the optimal one, leading to issues with the designed blades in the article. After careful consideration, we have decided to retract the paper to be accountable to the readers of the journal.

All authors agreed to retract this article.

The Editor-in-Chief and the Editorial office of FDMP-Fluid Dynamics & Materials Processing approved this retraction.

images
This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.