images
Intelligent Automation & Soft Computing
images

DOI: 10.32604/iasc.2023.047522

RETRACTION

Retraction: Precise Rehabilitation Strategies for Functional Impairment in Children with Cerebral Palsy

Intelligent Automation & Soft Computing Editorial Office

Published: 26 January 2024

The published article titled “Precise Rehabilitation Strategies for Functional Impairment in Children with Cerebral Palsy” has been retracted from Intelligent Automation & Soft Computing, Vol. 36, No. 3, 2023, pp. 3191–3202.

DOI: 10.32604/iasc.2023.035425

URL: https://www.techscience.com/iasc/v36n3/51927

The decision to retract the article has been made for the following reasons:

1. Misalignment with Journal Scope

2. Compromised Peer Review Process

Unfortunately, due to technical issues and changes in editorial staff, the article in question was mistakenly accepted and published without undergoing the review process by the Editor-in-Chief. Tech Science Press has rectified the technical issues, reinforced internal management procedures, and updated rigorous special issue policies to prevent such occurrences in the future.

Following a thorough assessment, the Editorial Board of Intelligent Automation & Soft Computing has no confidence in the reliability of this article, and the Editor-in-Chief has decided to retract this article from the journal. All authors have not responded to correspondence about this retraction.

As a responsible publisher, we hold the reliability and integrity of our published content in high regard. We deeply regret any inconvenience caused by this situation to our readers and all concerned parties.

images
Copyright © 2024 The Author. Published by Tech Science Press.
This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Table of Contents

Retraction: Precise Rehabilitation Strategies for Functional Impairment in Children with Cerebral Palsy

Guide

Retraction: Precise Rehabilitation Strategies for Functional Impairment in Children with Cerebral Palsy