images
Journal of Cyber Security
images

DOI: 10.32604/jcs.2022.040534

RETRACTION

Retraction: An Adaptive BWO Algorithm with RSA for Anomaly Detection in VANETs

Y. Sarada Devi and M. Roopa

DEPT of ECE SRM Institute of Science and Technology, Ramapuram, India

The published article titled “An Adaptive BWO Algorithm with RSA for Anomaly Detection in VANETs”, has been retracted from Journal of Cyber Security (JCS), Vol. 4, No. 3, 2022, pp. 153–167.

DOI: 10.32604/jcs.2022.033436

URL: https://www.techscience.com/JCS/v4n3/51399

The author Y. Sarada Devi, has requested to retract the manuscript from Journal of Cyber Security (JCS), which was mistakenly published without the author's consent due to a submission system error. Following discussions with the Editor-in-Chief, JCS takes full responsibility for the mistake and agrees with the retraction. We apologize for any inconvenience this may have caused and will make the necessary erratum.

images
Copyright © 2023 The Authors. Published by Tech Science Press.
This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Table of Contents

Retraction: An Adaptive BWO Algorithm with RSA for Anomaly Detection in VANETs

Guide

Retraction: An Adaptive BWO Algorithm with RSA for Anomaly Detection in VANETs