images
Journal of Renewable Materials
images

DOI: 10.32604/jrm.2021.017452

ERRATUM

Ancient Materials and Substitution Materials Used in Thai Historical Masonry Structure Preservation

Natthanan Wonganan, Chainarong Athisakul*, Peerasit Mahasuwanchai, Weerachart Tangchirapat, Raktipong Sahamitmongkol and Sutat Leelataviwat

Department of Civil Engineering, Faculty of Engineering, King Mongkut’s University of Technology Thonburi, Bangkok, 10140, Thailand
*Corresponding Author: Chainarong Athisakul. Email: chainarong.ath@kmutt.ac.th

Journal of Renewable Materials, Vol. 9, No. 2, pp. 179–204, 2021

The fourth author’s name in the original paper was incorrectly spelled as “Weerachart Tanchirapat”. The corrected spelling of the fourth author’s name is “Weerachart Tangchirapat”. The authors apologize for this error, which has now been corrected in the original article.

images
Copyright © 2021 The Authors. Published by Tech Science Press.
This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Table of Contents

Ancient Materials and Substitution Materials Used in Thai Historical Masonry Structure Preservation

Guide

Ancient Materials and Substitution Materials Used in Thai Historical Masonry Structure Preservation