Oncology Research
DOI: 10.32604/or.2024.056905
images

Retraction

Retraction: MicroRNA-1284 inhibits cell viability and induces apoptosis of ovarian cancer cell line OVCAR3

Oncology Research Editorial Office

Published: 18 September 2024

The published article titled “MicroRNA-1284 inhibits cell viability and induces apoptosis of ovarian cancer cell line OVCAR3” has been retracted from Oncology Research, Vol. 24, No. 6, 2016, pp. 429–435.

DOI: https://doi.org/10.3727/096504016X14685034103518

URL: https://www.techscience.com/or/v24n6/56992

Following the publication, concerns have been raised about a number of figures in this article. An unexpected area of similarity was identified in terms of the cellular data, where the results from differently performed experiments were intended to have been shown, although the areas immediately surrounding this area featured comparatively different distributions of cells. In addition, the western blots in this article were presented with atypical, unusually shaped and possibly anomalous protein bands in many cases.

The authors were contacted and invited to comment on the concerns raised and to provide the original, unmodified figures, but did not respond. The Editors-in-Chief therefore no longer have confidence in the integrity of the data in this article and decided to retract this article.

All authors have not responded to correspondence about this retraction. As a responsible publisher, we hold the reliability and integrity of our published content in high regard. We deeply regret any inconvenience caused by this situation to our readers and all concerned parties.

images
Copyright © 2024 The Author. Published by Tech Science Press.
This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Table of Contents

Retraction: MicroRNA-1284 inhibits cell viability and induces apoptosis of ovarian cancer cell line OVCAR3

Guide

Retraction: MicroRNA-1284 inhibits cell viability and induces apoptosis of ovarian cancer cell line OVCAR3