Oncology Research
DOI: 10.32604/or.2024.056887
images

Retraction

Retraction: Ailanthone promotes human vestibular schwannoma cell apoptosis and autophagy by downregulation of miR-21

Oncology Research Editorial Office

Published: 16 October 2024

The published article titled “Ailanthone promotes human vestibular schwannoma cell apoptosis and autophagy by downregulation of miR-21” has been retracted from Oncology Research, Vol. 26, No. 6, 2018, pp. 941–948.

DOI: 10.3727/096504018X15149775533331

URL: https://www.techscience.com/or/v26n6/56707

Following the publication, concerns have been raised about a number of figures in this article. The western blots in this article were presented with atypical, unusually shaped and possibly anomalous protein bands in many cases.

The authors were contacted and invited to comment on the concerns raised and to provide the original, unmodified figures, but did not respond. The Editors-in-Chief therefore no longer have confidence in the integrity of the data in this article and decided to retract this article.

All authors have not responded to correspondence about this retraction. As a responsible publisher, we hold the reliability and integrity of our published content in high regard. We deeply regret any inconvenience caused by this situation to our readers and all concerned parties.

images
Copyright © 2024 The Author. Published by Tech Science Press.
This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Table of Contents

Retraction: Ailanthone promotes human vestibular schwannoma cell apoptosis and autophagy by downregulation of miR-21

Guide

Retraction: Ailanthone promotes human vestibular schwannoma cell apoptosis and autophagy by downregulation of miR-21