Oncology Research
DOI: 10.32604/or.2024.056892
images

Retraction

Retraction: long noncoding RNA ANRIL promotes cervical cancer development by acting as a sponge of miR-186

Oncology Research Editorial Office

Published: 16 October 2024

The published article titled “long noncoding RNA ANRIL promotes cervical cancer development by acting as a sponge of miR-186” has been retracted from Oncology Research, Vol. 26, No. 3, 2018, pp. 345–352.

DOI: 10.3727/096504017X14953948675449

URL: https://www.techscience.com/or/v26n3/56647

Following the publication, concerns have been raised about a number of figures in this article. An unexpected area of similarity was identified in terms of the cellular data, where the results from differently performed experiments were intended to have been shown, although the areas immediately surrounding this area featured comparatively different distributions of cells.

The authors were contacted and invited to comment on the concerns raised and to provide the original, unmodified figures, but did not respond. The Editors-in-Chief therefore no longer have confidence in the integrity of the data in this article and decided to retract this article.

All authors have not responded to correspondence about this retraction. As a responsible publisher, we hold the reliability and integrity of our published content in high regard. We deeply regret any inconvenience caused by this situation to our readers and all concerned parties.

images
Copyright © 2024 The Author. Published by Tech Science Press.
This work is licensed under a Creative Commons Attribution 4.0 International License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Table of Contents

Retraction: long noncoding RNA ANRIL promotes cervical cancer development by acting as a sponge of miR-186

Guide

Retraction: long noncoding RNA ANRIL promotes cervical cancer development by acting as a sponge of miR-186